{"text":"REPORTE DE INGRESO Y SALIDA DEL PERSONAL","done":false,"flag":null,"alarm":null,"share_id":"c2d30b1eea52f9749bb292958d3c5534","note":"<p>OBJETIVO</p>\n<p>ADMINISTRADOR PUEDE VER CENTRALIZADO</p>\n<p>EL PERSONAL SOLO PUEDE VISUALIZAR EL PROPIO</p>\n<p>HORAS EXTRAS</p>\n<p>MEMORANDUM ( POR CADA CASO)&nbsp;</p>\n<p>pOR EMPRESA</p>\n<p>CONTENIDO DEL ASUNTO&nbsp;</p>\n<p>FALTA</p>\n<p>TARDANZA</p>\n<p>&nbsp;</p>","attachments":[{"name":"FASES DE IMPLEMENTACION DE ERP.docx","url":"https://docs.google.com/document/d/10q3y6QSSwtbehpJkWJYTiIm8tWiYwdYJ/edit?usp=drivesdk&ouid=113865892943474118622&rtpof=true&sd=true","view_url":"https://docs.google.com/document/d/10q3y6QSSwtbehpJkWJYTiIm8tWiYwdYJ/edit?usp=drivesdk&ouid=113865892943474118622&rtpof=true&sd=true","download_url":"https://drive.google.com/uc?id=10q3y6QSSwtbehpJkWJYTiIm8tWiYwdYJ&export=download","edit_url":"https://docs.google.com/document/d/10q3y6QSSwtbehpJkWJYTiIm8tWiYwdYJ/edit","size":29790,"mime":"application/vnd.openxmlformats-officedocument.wordprocessingml.document","drive_id":"10q3y6QSSwtbehpJkWJYTiIm8tWiYwdYJ"}]}